Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV1002

J œm H œm Ks œm JD � 2445000 Phase

11.418 0.025 11.155 0.022 11.099 0.042 4292.86 0.888 11.803 0.018 11.359 0.019 11.221 0.018 4343.60 0.553 11.905 0.053 11.446 0.044 11.343 0.045 4405.61 0.589 11.426 0.041 11.034 0.022 10.923 0.033 4666.83 0.161 11.460 0.023 11.019 0.017 10.935 0.018 4668.82 0.227 11.466 0.026 11.057 0.016 10.939 0.016 4669.79 0.259 11.440 0.045 11.050 0.023 10.963 0.020 4670.59 0.285 11.654 0.040 11.245 0.017 11.132 0.019 4675.63 0.450 11.356 0.040 11.090 0.041 11.049 0.043 4964.76 0.939 11.351 0.041 11.085 0.041 11.000 0.044 4966.76 0.005 11.374 0.027 11.015 0.029 10.924 0.041 5030.73 0.104 11.369 0.015 11.023 0.015 10.949 0.036 5059.65 0.054 11.469 0.022 11.061 0.021 10.945 0.023 5066.60 0.282 11.523 0.020 11.125 0.025 11.013 0.032 5068.60 0.347 11.510 0.019 11.113 0.025 11.009 0.032 5068.67 0.350 11.536 0.041 11.298 0.040 11.245 0.041 5081.87 0.783 11.442 0.036 11.217 0.017 11.142 0.016 5083.88 0.849 11.375 0.032 11.113 0.025 11.021 0.016 5086.86 0.947 11.892 0.016 11.469 0.018 11.363 0.017 5351.78 0.641 11.690 0.023 11.258 0.026 11.151 0.023 5377.75 0.493 11.907 0.015 11.459 0.017 11.360 0.021 5381.73 0.624 11.869 0.016 11.494 0.016 11.396 0.021 5383.68 0.688 11.733 0.018 11.440 0.015 11.338 0.023 5384.67 0.721 11.463 0.018 11.247 0.015 11.186 0.023 5387.76 0.822 11.590 0.017 11.198 0.016 11.077 0.020 5436.81 0.432