Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV1003

J œm H œm Ks œm JD � 2445000 Phase

11.715 0.019 11.468 0.017 11.357 0.038 4343.61 0.287 12.035 0.024 11.601 0.023 11.474 0.025 4651.81 0.938 11.714 0.051 11.364 0.034 11.314 0.039 4666.84 0.554 11.742 0.026 11.351 0.022 11.256 0.016 4668.83 0.636 11.802 0.030 11.353 0.016 11.253 0.017 4669.79 0.676 11.773 0.026 11.375 0.021 11.251 0.017 4670.60 0.709 12.024 0.041 11.589 0.016 11.496 0.019 4675.72 0.919 11.839 0.041 11.461 0.040 11.378 0.042 4965.73 0.822 11.816 0.024 11.558 0.037 11.479 0.028 4998.73 0.177 11.694 0.032 11.396 0.028 11.331 0.037 5003.76 0.384 11.680 0.022 11.355 0.027 11.264 0.039 5005.74 0.465 11.863 0.018 11.426 0.027 11.323 0.027 5061.78 0.765 11.858 0.032 11.462 0.026 11.362 0.020 5086.86 0.794 11.942 0.030 11.501 0.032 11.418 0.038 5088.66 0.868 12.108 0.022 11.697 0.027 11.580 0.039 5092.68 0.033 11.682 0.031 11.459 0.032 11.406 0.040 5121.57 0.219 11.837 0.023 11.413 0.026 11.328 0.023 5377.76 0.735 12.036 0.016 11.644 0.017 11.538 0.017 5383.69 0.978 12.106 0.031 11.735 0.023 11.624 0.019 5386.71 0.102 11.999 0.020 11.683 0.016 11.581 0.023 5387.76 0.145 11.690 0.034 11.444 0.031 11.359 0.021 5416.59 0.329 11.716 0.015 11.356 0.019 11.265 0.019 5445.77 0.526