Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV1005

J œm H œm Ks œm JD � 2445000 Phase

12.589 0.042 12.122 0.044 11.991 0.042 4963.80 0.305 12.737 0.046 12.260 0.046 12.140 0.046 4965.73 0.409 12.809 0.042 12.378 0.045 12.286 0.044 4967.74 0.516 12.402 0.040 12.097 0.041 11.946 0.042 4992.79 0.855 12.470 0.028 11.989 0.040 11.886 0.031 4998.75 0.173 12.632 0.054 12.311 0.056 12.325 0.056 5026.80 0.673 12.457 0.031 12.202 0.037 12.154 0.043 5027.71 0.721 12.332 0.030 11.981 0.033 11.895 0.040 5031.67 0.933 12.338 0.032 11.973 0.035 11.850 0.041 5032.70 0.988 12.378 0.022 11.963 0.027 11.840 0.031 5033.85 0.049 12.384 0.022 11.954 0.028 11.839 0.032 5034.68 0.094 12.499 0.019 12.044 0.021 11.920 0.023 5055.82 0.224 12.693 0.022 12.230 0.031 12.083 0.045 5058.80 0.383 12.415 0.023 12.164 0.027 12.105 0.026 5065.67 0.750 12.400 0.027 12.094 0.026 11.992 0.027 5066.61 0.800 12.845 0.043 12.420 0.046 12.324 0.046 5081.74 0.609 12.349 0.033 12.019 0.028 11.950 0.023 5086.81 0.880 12.366 0.033 11.975 0.034 11.868 0.040 5088.80 0.987 12.809 0.039 12.353 0.025 12.210 0.033 5378.77 0.485 12.847 0.047 12.377 0.037 12.276 0.040 5378.85 0.489 12.837 0.035 12.426 0.025 12.284 0.031 5379.74 0.536 12.882 0.022 12.482 0.021 12.342 0.023 5380.79 0.593 12.413 0.033 12.029 0.024 11.912 0.020 5386.77 0.912 12.544 0.023 12.055 0.024 11.921 0.027 5411.68 0.244 12.678 0.025 12.185 0.028 12.040 0.030 5413.71 0.352