Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV1006

J œm H œm Ks œm JD � 2445000 Phase

12.756 0.043 12.297 0.041 12.192 0.044 4963.81 0.266 12.917 0.044 12.414 0.044 12.381 0.050 4965.75 0.402 13.024 0.044 12.580 0.041 12.429 0.043 4966.77 0.474 12.979 0.044 12.586 0.041 12.460 0.039 4997.81 0.658 12.623 0.027 12.388 0.032 12.269 0.044 5027.72 0.762 12.636 0.030 12.282 0.031 12.150 0.042 5030.75 0.976 12.615 0.028 12.205 0.032 12.095 0.043 5031.67 0.040 12.642 0.032 12.239 0.034 12.103 0.041 5032.71 0.113 12.681 0.023 12.252 0.024 12.102 0.030 5033.64 0.179 12.927 0.023 12.567 0.026 12.426 0.038 5067.61 0.570 12.669 0.035 12.329 0.017 12.246 0.026 5085.79 0.849 12.594 0.032 12.255 0.025 12.177 0.022 5086.80 0.920 12.582 0.032 12.236 0.026 12.094 0.032 5087.84 0.993 12.659 0.048 12.223 0.043 12.123 0.048 5088.81 0.061 12.869 0.021 12.397 0.026 12.300 0.045 5092.70 0.335 12.838 0.021 12.369 0.020 12.262 0.023 5120.68 0.304 13.001 0.025 12.540 0.022 12.449 0.023 5123.56 0.506 12.810 0.020 12.476 0.021 12.367 0.026 5126.56 0.717 12.932 0.020 12.579 0.019 12.457 0.025 5380.81 0.607 12.670 0.016 12.365 0.018 12.306 0.023 5383.70 0.810 12.645 0.019 12.327 0.023 12.221 0.022 5384.68 0.879 12.681 0.021 12.247 0.021 12.136 0.023 5388.70 0.162 12.868 0.020 12.539 0.018 12.400 0.025 5410.69 0.709 12.628 0.022 12.238 0.023 12.105 0.031 5414.75 0.995