Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV1013

J œm H œm Ks œm JD � 2445000 Phase

11.983 0.019 11.507 0.016 11.323 0.016 4343.61 0.999 12.292 0.041 11.841 0.028 11.772 0.030 4666.84 0.394 12.312 0.027 11.915 0.023 11.780 0.024 4668.83 0.476 12.215 0.027 11.842 0.023 11.750 0.015 4669.85 0.518 12.081 0.025 11.723 0.026 11.635 0.028 4670.60 0.550 11.941 0.040 11.564 0.020 11.425 0.017 4675.73 0.762 12.217 0.025 11.755 0.026 11.625 0.025 4760.69 0.283 11.966 0.040 11.627 0.041 11.505 0.040 4962.79 0.658 11.941 0.040 11.496 0.041 11.355 0.041 4967.80 0.865 12.064 0.042 11.538 0.033 11.405 0.038 4997.78 0.108 12.260 0.027 11.793 0.031 11.648 0.041 5027.77 0.350 11.999 0.020 11.661 0.024 11.573 0.029 5033.86 0.603 11.935 0.018 11.548 0.023 11.487 0.026 5060.80 0.719 11.921 0.016 11.478 0.016 11.361 0.022 5065.62 0.919 11.994 0.025 11.515 0.026 11.392 0.032 5068.60 0.043 11.889 0.033 11.518 0.016 11.396 0.026 5085.87 0.758 11.890 0.031 11.483 0.025 11.383 0.020 5086.85 0.799 11.901 0.031 11.455 0.031 11.331 0.039 5088.66 0.874 11.911 0.017 11.457 0.026 11.359 0.031 5089.67 0.916 12.098 0.034 11.583 0.018 11.461 0.022 5119.69 0.160 12.209 0.031 11.700 0.031 11.567 0.043 5121.58 0.238 11.925 0.035 11.463 0.022 11.347 0.026 5379.79 0.938 11.943 0.018 11.459 0.016 11.345 0.020 5380.82 0.981 12.250 0.030 11.693 0.024 11.553 0.023 5386.78 0.228 12.261 0.022 11.754 0.022 11.630 0.024 5412.66 0.300 12.278 0.032 11.837 0.027 11.733 0.022 5415.64 0.424