Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV1019

J œm H œm Ks œm JD � 2445000 Phase

12.738 0.042 12.363 0.044 12.222 0.042 4964.77 0.468 12.752 0.047 12.341 0.044 12.228 0.049 4965.76 0.540 12.861 0.046 12.427 0.056 12.284 0.062 4967.81 0.691 12.948 0.044 12.520 0.035 12.432 0.042 4997.83 0.889 12.751 0.021 12.389 0.032 12.275 0.036 5004.72 0.393 13.073 0.055 12.634 0.057 12.547 0.059 5026.82 0.011 12.981 0.031 12.572 0.035 12.433 0.042 5027.78 0.081 12.860 0.045 12.460 0.031 12.373 0.043 5030.76 0.299 12.828 0.019 12.394 0.025 12.262 0.034 5034.83 0.597 12.979 0.021 12.561 0.028 12.471 0.026 5066.62 0.925 12.829 0.039 12.500 0.022 12.402 0.024 5083.83 0.185 12.766 0.031 12.440 0.055 12.330 0.037 5084.82 0.257 12.797 0.021 12.390 0.029 12.300 0.030 5089.68 0.613 13.041 0.025 12.543 0.032 12.464 0.038 5092.72 0.835 12.959 0.038 12.508 0.024 12.402 0.028 5119.70 0.811 12.959 0.039 12.483 0.024 12.385 0.030 5378.78 0.778 12.966 0.047 12.495 0.037 12.395 0.040 5378.84 0.782 12.912 0.020 12.568 0.023 12.478 0.019 5383.71 0.138 12.770 0.022 12.476 0.022 12.392 0.022 5384.69 0.210 12.834 0.032 12.462 0.025 12.365 0.025 5386.79 0.364 12.788 0.021 12.411 0.020 12.312 0.028 5387.77 0.436 12.776 0.017 12.373 0.020 12.258 0.030 5388.71 0.505 12.980 0.023 12.588 0.020 12.489 0.027 5408.65 0.965 12.985 0.022 12.621 0.032 12.487 0.034 5409.78 0.047 12.959 0.025 12.597 0.030 12.492 0.040 5410.70 0.114