Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV1023

J œm H œm Ks œm JD � 2445000 Phase

11.876 0.023 11.465 0.021 11.323 0.024 4343.62 0.672 12.333 0.024 11.879 0.023 11.731 0.024 4651.83 0.285 11.973 0.042 11.477 0.024 11.365 0.029 4666.86 0.852 11.951 0.025 11.469 0.017 11.377 0.015 4668.84 0.926 12.016 0.029 11.543 0.017 11.370 0.020 4669.85 0.965 12.003 0.022 11.516 0.028 11.414 0.024 4670.61 0.993 12.255 0.038 11.780 0.021 11.648 0.021 4675.74 0.186 12.262 0.026 11.889 0.028 11.773 0.025 4760.72 0.388 12.144 0.040 11.643 0.041 11.506 0.040 4964.78 0.078 11.934 0.033 11.595 0.028 11.493 0.037 5003.77 0.547 11.873 0.021 11.508 0.027 11.402 0.039 5005.75 0.621 12.021 0.025 11.718 0.030 11.630 0.041 5027.78 0.452 11.859 0.017 11.461 0.024 11.337 0.030 5034.65 0.711 12.011 0.070 11.688 0.070 11.641 0.070 5081.86 0.490 11.871 0.033 11.507 0.017 11.400 0.023 5085.87 0.641 11.834 0.030 11.436 0.030 11.317 0.037 5088.66 0.746 11.873 0.018 11.458 0.026 11.326 0.026 5089.69 0.784 12.145 0.065 11.583 0.065 11.445 0.065 5122.68 0.027 12.184 0.017 11.682 0.021 11.573 0.029 5125.57 0.137 11.906 0.026 11.527 0.025 11.426 0.032 5376.81 0.603 11.924 0.016 11.467 0.017 11.346 0.023 5384.74 0.902 11.903 0.017 11.438 0.021 11.316 0.027 5409.79 0.846 12.141 0.034 11.637 0.031 11.517 0.023 5416.60 0.103 12.266 0.016 11.786 0.024 11.649 0.023 5446.69 0.236