Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV12225

J œm H œm Ks œm JD � 2445000 Phase

14.901 0.037 14.567 0.029 14.570 0.027 4344.65 0.670 14.975 0.032 14.601 0.028 14.533 0.032 4642.87 0.836 15.046 0.028 14.747 0.048 14.727 0.044 4998.89 0.217 14.931 0.039 14.600 0.047 14.504 0.041 4999.87 0.542 14.931 0.024 14.629 0.033 14.525 0.023 5054.80 0.806 14.916 0.046 14.572 0.048 14.540 0.064 5081.80 0.786 14.875 0.042 14.608 0.043 14.476 0.040 5083.70 0.417 15.085 0.042 14.701 0.040 14.557 0.058 5088.73 0.090 15.071 0.063 14.707 0.064 14.668 0.063 5377.79 0.209 14.936 0.028 14.571 0.029 14.545 0.046 5412.79 0.847 14.947 0.025 14.631 0.039 14.538 0.064 5418.87 0.868 15.063 0.036 14.768 0.017 14.694 0.043 5419.87 0.199