Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV12452

J œm H œm Ks œm JD � 2445000 Phase

13.244 0.016 12.924 0.020 12.831 0.027 4344.65 0.321 13.418 0.031 13.040 0.019 12.937 0.028 4644.82 0.680 13.259 0.042 13.024 0.039 12.927 0.039 4997.88 0.094 13.270 0.028 12.970 0.040 12.900 0.031 4998.88 0.209 13.303 0.026 12.948 0.021 12.863 0.018 5000.89 0.439 13.379 0.022 12.978 0.023 12.942 0.026 5001.69 0.530 13.479 0.033 13.066 0.034 12.993 0.038 5003.86 0.779 13.558 0.034 13.172 0.032 13.071 0.044 5030.88 0.872 13.486 0.031 13.160 0.032 13.067 0.042 5031.78 0.975 13.368 0.020 12.981 0.021 12.904 0.023 5054.80 0.610 13.381 0.030 13.077 0.053 13.000 0.040 5084.71 0.034 13.250 0.036 12.951 0.026 12.881 0.025 5086.73 0.265 13.203 0.034 12.911 0.030 12.815 0.033 5087.83 0.390 13.342 0.037 12.956 0.038 12.855 0.042 5088.71 0.492 13.341 0.046 12.971 0.047 12.865 0.046 5377.78 0.581 13.533 0.044 13.133 0.037 13.069 0.037 5379.81 0.812 13.256 0.020 12.931 0.021 12.867 0.025 5436.77 0.333 13.252 0.019 12.913 0.020 12.848 0.021 5437.70 0.439 13.375 0.019 12.997 0.024 12.893 0.024 5438.73 0.557 13.437 0.032 13.026 0.022 12.907 0.024 5439.62 0.659 13.502 0.029 13.119 0.033 13.001 0.035 5440.72 0.785 13.273 0.022 12.953 0.025 12.857 0.030 5445.63 0.347 13.289 0.022 12.954 0.028 12.862 0.024 5446.67 0.466