Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV12471

J œm H œm Ks œm JD � 2445000 Phase

12.755 0.016 12.376 0.018 12.247 0.024 4344.66 0.088 12.749 0.019 12.328 0.017 12.195 0.023 4757.69 0.145 12.827 0.022 12.324 0.017 12.163 0.024 4761.56 0.389 12.876 0.035 12.579 0.041 12.397 0.046 4992.89 0.982 13.092 0.037 12.557 0.034 12.434 0.039 5003.85 0.674 13.045 0.022 12.594 0.033 12.461 0.043 5005.86 0.801 12.862 0.030 12.384 0.040 12.237 0.039 5032.68 0.493 12.993 0.019 12.469 0.025 12.274 0.029 5033.77 0.561 13.062 0.018 12.576 0.029 12.386 0.042 5034.79 0.626 13.074 0.018 12.564 0.027 12.359 0.038 5034.80 0.627 13.069 0.017 12.640 0.017 12.488 0.018 5054.81 0.889 12.842 0.017 12.459 0.021 12.350 0.017 5056.75 0.011 12.780 0.027 12.421 0.016 12.308 0.021 5057.79 0.077 12.745 0.016 12.318 0.018 12.207 0.038 5059.76 0.201 12.762 0.017 12.314 0.024 12.200 0.026 5060.71 0.261 12.795 0.019 12.315 0.028 12.174 0.030 5061.76 0.327 13.090 0.038 12.579 0.021 12.425 0.026 5083.71 0.712 12.879 0.021 12.387 0.018 12.226 0.023 5126.55 0.414 12.779 0.047 12.300 0.037 12.179 0.040 5378.78 0.327 12.795 0.037 12.313 0.021 12.202 0.028 5378.85 0.331 13.069 0.021 12.597 0.029 12.445 0.022 5385.83 0.772 13.087 0.033 12.627 0.027 12.472 0.024 5386.84 0.835 12.832 0.016 12.312 0.020 12.175 0.027 5411.77 0.408