Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV12505

J œm H œm Ks œm JD � 2445000 Phase

12.919 0.046 12.425 0.044 12.327 0.044 4963.89 0.071 12.965 0.044 12.466 0.044 12.325 0.047 4964.90 0.141 13.077 0.042 12.574 0.046 12.439 0.049 4966.90 0.281 13.143 0.041 12.606 0.058 12.440 0.047 4967.88 0.349 13.054 0.039 12.660 0.057 12.560 0.053 5030.60 0.709 12.947 0.031 12.591 0.033 12.489 0.045 5031.81 0.792 12.862 0.031 12.557 0.039 12.435 0.042 5032.69 0.854 12.897 0.023 12.485 0.030 12.357 0.033 5033.81 0.931 12.933 0.050 12.512 0.052 12.336 0.042 5034.81 0.001 13.184 0.021 12.670 0.020 12.524 0.024 5054.82 0.392 13.236 0.022 12.744 0.028 12.598 0.025 5055.73 0.455 13.229 0.020 12.771 0.021 12.640 0.024 5056.79 0.529 13.208 0.029 12.761 0.025 12.634 0.025 5057.80 0.600 13.244 0.025 12.806 0.032 12.686 0.046 5058.74 0.665 13.036 0.027 12.528 0.026 12.367 0.031 5066.77 0.223 13.121 0.036 12.738 0.029 12.614 0.033 5087.88 0.690 13.003 0.030 12.622 0.034 12.519 0.038 5088.71 0.748 12.923 0.047 12.481 0.037 12.394 0.040 5378.78 0.913 12.961 0.028 12.488 0.029 12.335 0.033 5410.79 0.138