Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV12656

J œm H œm Ks œm JD � 2445000 Phase

12.753 0.041 12.396 0.044 12.307 0.041 4963.90 0.445 12.854 0.043 12.459 0.051 12.332 0.053 4967.89 0.742 12.760 0.018 12.413 0.028 12.319 0.046 5058.76 0.524 12.778 0.019 12.377 0.019 12.328 0.034 5059.77 0.599 12.806 0.017 12.404 0.024 12.338 0.033 5060.83 0.678 12.863 0.064 12.517 0.041 12.450 0.062 5066.79 0.123 12.761 0.020 12.455 0.028 12.401 0.035 5067.72 0.192 12.719 0.041 12.419 0.042 12.362 0.041 5081.84 0.246 12.884 0.030 12.455 0.032 12.377 0.041 5088.79 0.765 12.905 0.018 12.508 0.030 12.401 0.031 5089.78 0.839 12.899 0.024 12.532 0.024 12.431 0.035 5090.81 0.915 12.906 0.022 12.511 0.027 12.447 0.023 5091.61 0.976 12.887 0.022 12.522 0.027 12.463 0.039 5092.69 0.056 12.854 0.035 12.509 0.021 12.421 0.029 5119.71 0.073 12.701 0.044 12.414 0.051 12.355 0.048 5122.63 0.290 12.687 0.038 12.382 0.039 12.312 0.038 5377.78 0.332 12.786 0.044 12.424 0.037 12.334 0.037 5379.80 0.483 12.873 0.016 12.475 0.015 12.394 0.021 5383.83 0.783 12.939 0.032 12.566 0.028 12.426 0.016 5386.86 0.009 12.817 0.017 12.522 0.027 12.384 0.026 5388.82 0.156 12.928 0.022 12.559 0.025 12.481 0.023 5412.79 0.944 12.855 0.022 12.532 0.024 12.457 0.032 5414.81 0.095