Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV12700

J œm H œm Ks œm JD � 2445000 Phase

13.433 0.019 13.154 0.030 13.029 0.033 4344.67 0.922 13.464 0.028 13.140 0.025 13.026 0.019 4645.86 0.866 13.433 0.027 13.100 0.038 12.993 0.029 4998.88 0.167 13.469 0.040 13.070 0.037 13.005 0.036 4999.86 0.288 13.534 0.027 13.151 0.021 13.040 0.020 5000.88 0.413 13.602 0.019 13.215 0.021 13.074 0.020 5001.87 0.534 13.597 0.021 13.270 0.025 13.152 0.030 5002.89 0.659 13.489 0.034 13.176 0.032 13.118 0.038 5003.89 0.782 13.427 0.018 13.085 0.023 13.006 0.018 5054.85 0.033 13.429 0.048 13.079 0.043 13.042 0.052 5081.83 0.342 13.619 0.028 13.243 0.053 13.174 0.038 5084.73 0.698 13.388 0.034 13.084 0.030 13.000 0.031 5087.78 0.073 13.412 0.031 13.053 0.033 12.980 0.040 5088.70 0.185 13.468 0.030 13.104 0.023 13.022 0.031 5414.86 0.193 13.463 0.027 13.093 0.031 13.052 0.036 5415.85 0.314 13.523 0.038 13.143 0.038 13.089 0.032 5416.86 0.438 13.577 0.034 13.213 0.019 13.186 0.028 5417.86 0.560 13.585 0.023 13.220 0.018 13.191 0.027 5418.87 0.684 13.463 0.029 13.197 0.027 13.145 0.028 5419.86 0.806 13.451 0.023 13.123 0.020 12.956 0.022 5437.74 0.999 13.427 0.017 13.094 0.025 13.003 0.018 5438.62 0.107 13.491 0.030 13.123 0.022 12.983 0.026 5439.59 0.225 13.447 0.031 13.100 0.037 .... .... 5440.60 0.350 13.433 0.023 13.127 0.022 13.033 0.016 5445.61 0.964 13.465 0.017 13.125 0.023 13.054 0.024 5446.63 0.089