Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV12717

J œm H œm Ks œm JD � 2445000 Phase

13.572 0.023 13.213 0.021 13.064 0.052 4344.68 0.321 13.606 0.025 13.187 0.032 13.098 0.029 4760.57 0.353 13.274 0.025 13.012 0.023 12.890 0.023 5001.88 0.641 13.285 0.021 13.038 0.026 12.915 0.025 5002.82 0.747 .... .... 13.060 0.085 12.974 0.089 5027.78 0.570 13.414 0.074 13.004 0.074 12.915 0.079 5031.79 0.023 13.460 0.075 13.030 0.076 13.010 0.078 5032.78 0.136 13.382 0.035 13.115 0.034 13.090 0.035 5053.79 0.512 13.254 0.034 12.973 0.034 12.864 0.034 5056.76 0.848 13.376 0.038 12.995 0.034 12.892 0.035 5057.81 0.966 13.281 0.038 12.947 0.020 12.879 0.027 5083.76 0.901 13.479 0.034 13.090 0.025 13.009 0.020 5086.71 0.235 13.435 0.021 13.013 0.028 12.947 0.029 5412.82 0.113 13.233 0.022 12.940 0.027 12.852 0.028 5436.64 0.807 13.277 0.020 12.944 0.027 12.810 0.029 5437.68 0.924 13.387 0.017 12.988 0.029 12.901 0.036 5438.63 0.032 13.449 0.029 13.051 0.022 12.899 0.037 5439.60 0.141 13.516 0.026 13.102 0.036 13.033 0.046 5440.59 0.253 13.254 0.019 12.959 0.020 12.893 0.025 5445.60 0.819