Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV12724

J œm H œm Ks œm JD � 2445000 Phase

13.037 0.041 12.578 0.041 12.433 0.047 4967.90 0.469 13.227 0.029 12.804 0.032 12.712 0.040 5027.79 0.826 13.064 0.032 12.661 0.041 12.609 0.051 5030.65 0.035 12.943 0.027 12.626 0.035 12.549 0.041 5031.83 0.120 12.941 0.022 12.547 0.028 12.397 0.036 5033.81 0.265 12.970 0.017 12.541 0.026 12.400 0.032 5034.82 0.338 13.236 0.020 12.780 0.020 12.650 0.020 5053.79 0.719 13.234 0.020 12.819 0.024 12.738 0.023 5056.79 0.937 13.045 0.028 12.714 0.024 12.589 0.025 5057.82 0.011 12.949 0.020 12.529 0.024 12.438 0.028 5060.74 0.224 13.153 0.033 12.692 0.031 12.543 0.026 5120.57 0.577 13.205 0.034 12.700 0.036 12.603 0.043 5121.61 0.653 13.248 0.025 12.854 0.039 12.727 0.041 5124.55 0.867 12.997 0.021 12.501 0.022 12.392 0.021 5351.84 0.404 12.931 0.038 12.503 0.039 12.381 0.038 5377.77 0.292 12.990 0.047 12.525 0.037 12.415 0.040 5378.77 0.364 13.011 0.044 12.542 0.037 12.440 0.037 5379.80 0.439 13.045 0.025 12.566 0.020 12.453 0.026 5380.86 0.516 13.142 0.018 12.642 0.023 12.540 0.025 5381.85 0.588 13.197 0.047 12.833 0.029 12.674 0.048 5384.82 0.804 13.115 0.020 12.613 0.028 12.506 0.021 5408.84 0.552