Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV12747

J œm H œm Ks œm JD � 2445000 Phase

14.774 0.038 14.432 0.038 14.310 0.069 4344.70 0.139 14.621 0.032 14.297 0.023 14.266 0.027 4644.84 0.529 14.647 0.030 14.302 0.040 14.217 0.031 4998.87 0.893 14.571 0.027 14.280 0.025 14.198 0.026 5001.81 0.710 14.732 0.025 14.365 0.025 14.275 0.030 5002.82 0.993 14.795 0.040 14.520 0.041 14.453 0.052 5003.88 0.287 14.692 0.033 14.354 0.039 14.268 0.045 5027.85 0.945 14.732 0.034 14.396 0.035 14.330 0.046 5031.81 0.046 14.780 0.041 14.488 0.053 14.437 0.046 5032.79 0.319 14.513 0.022 14.328 0.033 14.277 0.024 5054.82 0.440 14.825 0.055 14.406 0.056 14.315 0.055 5377.76 0.167 14.574 0.062 14.293 0.054 14.266 0.056 5378.76 0.444 14.598 0.076 14.299 0.072 14.318 0.037 5379.79 0.730