Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV12765

J œm H œm Ks œm JD � 2445000 Phase

14.138 0.031 13.890 0.040 13.803 0.036 5412.83 0.433 14.235 0.027 13.904 0.023 13.874 0.025 5413.87 0.736 14.225 0.044 13.980 0.027 13.891 0.037 5414.88 0.031 14.111 0.027 13.850 0.035 13.787 0.022 5415.86 0.318 14.200 0.034 13.870 0.036 13.818 0.034 5416.87 0.611 14.251 0.037 13.955 0.029 13.911 0.028 5417.87 0.903 14.203 0.016 13.932 0.024 13.894 0.023 5418.77 0.165 14.122 0.021 13.903 0.022 13.812 0.029 5419.77 0.457