Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV12815

J œm H œm Ks œm JD � 2445000 Phase

11.811 0.016 11.349 0.016 11.229 0.015 4759.69 0.624 11.810 0.040 11.317 0.040 11.184 0.042 4992.90 0.572 12.183 0.032 11.749 0.028 11.643 0.037 5003.88 0.993 11.847 0.022 11.537 0.027 11.462 0.039 5005.87 0.069 11.721 0.017 11.386 0.029 11.294 0.026 5061.82 0.216 11.709 0.018 11.265 0.022 11.152 0.032 5067.78 0.445 11.971 0.036 11.633 0.017 11.529 0.016 5083.75 0.058 11.859 0.030 11.515 0.051 11.445 0.031 5084.76 0.097 11.780 0.032 11.473 0.016 11.384 0.023 5085.67 0.131 11.702 0.031 11.374 0.026 11.283 0.031 5087.77 0.212 11.685 0.031 11.383 0.027 11.297 0.031 5087.83 0.214 11.681 0.029 11.335 0.030 11.244 0.039 5088.68 0.247 11.715 0.030 11.351 0.031 11.273 0.039 5088.80 0.251 11.695 0.018 11.322 0.025 11.226 0.027 5089.80 0.290 11.685 0.020 11.284 0.025 11.172 0.036 5092.83 0.406 11.673 0.016 11.284 0.018 11.193 0.017 5351.82 0.343 11.686 0.025 11.291 0.027 11.196 0.025 5377.83 0.341 11.684 0.047 11.286 0.037 11.180 0.040 5378.74 0.376 11.701 0.036 11.289 0.021 11.190 0.027 5378.86 0.381 11.700 0.015 11.256 0.016 11.145 0.020 5381.86 0.496 11.968 0.016 11.449 0.018 11.334 0.023 5388.83 0.763 12.001 0.017 11.491 0.017 11.363 0.020 5389.81 0.801 11.818 0.020 11.316 0.016 11.187 0.024 5410.81 0.607 11.889 0.022 11.373 0.022 11.235 0.023 5412.80 0.683 12.028 0.033 11.549 0.030 11.396 0.021 5416.82 0.837 12.066 0.020 11.613 0.018 11.483 0.016 5444.66 0.905 12.085 0.016 11.652 0.019 11.516 0.021 5445.59 0.941