Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV12816

J œm H œm Ks œm JD � 2445000 Phase

13.460 0.026 13.098 0.028 12.999 0.078 4292.83 0.342 13.329 0.027 13.041 0.048 12.951 0.040 4344.73 0.041 13.357 0.042 13.008 0.061 12.985 0.059 4963.91 0.024 13.523 0.028 13.160 0.028 13.094 0.045 5031.84 0.483 13.233 0.019 12.994 0.023 12.915 0.027 5053.80 0.895 13.282 0.017 13.002 0.016 12.944 0.017 5054.86 0.010 13.309 0.022 13.019 0.021 12.921 0.023 5055.86 0.120 13.438 0.030 13.103 0.017 13.000 0.020 5057.78 0.331 13.268 0.020 13.054 0.029 12.953 0.028 5061.84 0.777 13.481 0.021 13.188 0.027 13.083 0.035 5068.70 0.531 13.349 0.039 13.005 0.023 12.935 0.025 5083.74 0.182 13.434 0.031 13.041 0.052 13.005 0.038 5084.77 0.294 13.495 0.035 13.129 0.026 13.027 0.031 5085.67 0.393 13.381 0.032 13.123 0.026 13.018 0.033 5087.77 0.624 13.271 0.031 13.036 0.040 12.981 0.041 5088.68 0.724 13.488 0.054 13.177 0.045 13.115 0.048 5378.75 0.573 13.327 0.067 13.077 0.063 13.058 0.063 5379.77 0.685 13.376 0.026 13.127 0.028 13.066 0.031 5415.73 0.633 13.360 0.026 13.114 0.025 13.051 0.036 5415.80 0.641 13.276 0.034 13.034 0.031 12.964 0.022 5416.79 0.750 13.246 0.017 12.993 0.021 12.942 0.026 5436.63 0.928 13.306 0.017 12.991 0.021 12.971 0.019 5437.67 0.043 13.303 0.016 12.997 0.027 12.866 0.026 5438.59 0.143 13.426 0.033 13.040 0.022 13.018 0.026 5439.57 0.251 13.451 0.027 13.100 0.036 12.987 0.035 5440.58 0.361 13.223 0.021 12.996 0.019 12.949 0.018 5444.64 0.808 13.225 0.015 12.960 0.028 12.901 0.023 5445.58 0.910 13.351 0.017 13.037 0.042 12.972 0.023 5446.60 0.023