Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV13048

J œm H œm Ks œm JD � 2445000 Phase

13.784 0.023 13.465 0.041 13.436 0.079 4344.75 0.987 13.677 0.034 13.335 0.027 13.263 0.031 4644.86 0.778 13.632 0.045 13.381 0.035 13.328 0.041 4997.89 0.292 13.605 0.025 13.300 0.039 13.253 0.031 4998.85 0.432 13.645 0.041 13.285 0.042 13.192 0.035 4999.86 0.579 13.698 0.028 13.348 0.025 13.229 0.019 5000.87 0.728 13.714 0.023 13.350 0.025 13.264 0.026 5001.86 0.872 13.851 0.025 13.507 0.020 13.356 0.031 5002.88 0.020 13.708 0.034 13.421 0.030 13.340 0.040 5003.87 0.165 13.631 0.036 13.281 0.031 13.198 0.042 5027.86 0.665 13.575 0.030 13.271 0.037 13.229 0.045 5032.86 0.395 13.658 0.052 13.286 0.046 13.231 0.045 5081.79 0.534 13.818 0.037 13.461 0.054 13.377 0.036 5084.85 0.981 13.885 0.035 13.473 0.020 13.399 0.030 5085.68 0.102 13.653 0.033 13.364 0.033 13.299 0.023 5086.70 0.251 13.589 0.033 13.285 0.033 13.212 0.037 5087.76 0.406 13.853 0.059 13.468 0.053 13.414 0.063 5379.75 0.014