Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV2244

J œm H œm Ks œm JD � 2445000 Phase

12.728 0.041 12.426 0.040 12.421 0.047 4964.79 0.391 12.664 0.040 12.306 0.041 12.279 0.040 4966.77 0.534 12.700 0.042 12.269 0.040 12.205 0.037 4997.83 0.756 12.959 0.022 12.589 0.038 12.442 0.037 5004.73 0.250 12.768 0.053 12.342 0.056 12.244 0.053 5026.83 0.832 12.880 0.033 12.394 0.031 12.304 0.045 5027.80 0.902 13.002 0.028 12.624 0.035 12.467 0.042 5030.77 0.114 12.971 0.029 12.590 0.028 12.508 0.039 5031.77 0.187 12.720 0.021 12.442 0.030 12.356 0.036 5033.65 0.321 12.952 0.016 12.496 0.019 12.381 0.018 5056.80 0.978 13.004 0.025 12.566 0.021 12.445 0.018 5057.82 0.051 12.648 0.016 12.297 0.017 12.194 0.020 5065.65 0.611 12.680 0.020 12.294 0.026 12.183 0.022 5066.68 0.685 12.972 0.044 12.594 0.038 12.479 0.039 5086.87 0.130 12.997 0.053 12.592 0.050 12.496 0.051 5087.84 0.200 12.665 0.023 12.393 0.022 12.284 0.042 5090.67 0.402 12.790 0.039 12.352 0.039 12.269 0.039 5376.79 0.883 12.834 0.026 12.375 0.027 12.270 0.035 5376.82 0.886 12.921 0.024 12.450 0.031 12.323 0.028 5377.77 0.954 12.866 0.038 12.436 0.039 12.331 0.038 5377.87 0.961 12.991 0.037 12.542 0.022 12.459 0.037 5378.79 0.026 12.996 0.047 12.539 0.037 12.434 0.040 5378.84 0.030 12.669 0.017 12.373 0.016 12.300 0.025 5384.74 0.453 12.706 0.031 12.321 0.024 12.194 0.023 5386.80 0.600 12.671 0.020 12.285 0.016 12.188 0.024 5387.78 0.670 12.868 0.018 12.553 0.018 12.480 0.030 5410.71 0.311