Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV2251

J œm H œm Ks œm JD � 2445000 Phase

11.930 0.033 11.471 0.017 11.370 0.046 4290.84 0.486 11.781 0.019 11.327 0.016 11.166 0.016 4343.62 0.374 11.523 0.025 11.159 0.021 11.057 0.019 4668.54 0.996 11.553 0.029 11.147 0.017 11.053 0.021 4669.77 0.040 11.515 0.024 11.131 0.026 11.054 0.019 4670.62 0.071 11.688 0.038 11.246 0.019 11.130 0.020 4675.75 0.254 12.060 0.042 11.645 0.041 11.505 0.043 4963.82 0.559 11.664 0.040 11.439 0.042 11.362 0.041 4967.80 0.701 11.579 0.054 11.294 0.053 11.211 0.053 5026.84 0.813 11.525 0.028 11.156 0.029 11.082 0.042 5030.75 0.953 11.659 0.016 11.204 0.016 11.098 0.019 5065.66 0.202 11.750 0.019 11.299 0.026 11.192 0.031 5068.61 0.307 11.545 0.041 11.310 0.042 11.224 0.041 5081.75 0.777 11.559 0.038 11.263 0.018 11.156 0.017 5083.88 0.853 11.540 0.028 11.209 0.051 11.126 0.030 5084.87 0.889 11.467 0.031 11.153 0.024 11.076 0.018 5086.88 0.961 11.518 0.030 11.133 0.030 11.038 0.039 5088.66 0.024 11.653 0.020 11.193 0.024 11.082 0.035 5092.73 0.170 11.925 0.016 11.492 0.017 11.375 0.022 5351.79 0.436 11.880 0.025 11.418 0.026 11.284 0.023 5377.78 0.366 11.954 0.033 11.514 0.024 11.410 0.024 5379.79 0.438 12.056 0.019 11.628 0.015 11.501 0.022 5381.78 0.509 12.108 0.017 11.689 0.017 11.572 0.015 5383.75 0.580 11.925 0.017 11.598 0.017 11.513 0.025 5384.75 0.615 11.656 0.019 11.447 0.031 11.396 0.020 5385.76 0.652 11.589 0.027 11.339 0.025 11.268 0.027 5415.65 0.721