Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV2257

J œm H œm Ks œm JD � 2445000 Phase

11.214 0.049 10.917 0.037 10.829 0.038 4406.55 0.143 11.663 0.024 11.161 0.021 11.069 0.019 4668.55 0.811 11.741 0.027 11.237 0.016 11.135 0.021 4669.81 0.843 11.746 0.027 11.263 0.022 11.112 0.020 4670.84 0.869 11.381 0.039 11.099 0.016 11.022 0.018 4675.75 0.994 11.187 0.041 10.808 0.041 10.694 0.041 4962.80 0.299 11.218 0.041 10.792 0.040 10.681 0.041 4966.78 0.401 11.217 0.025 10.860 0.038 10.746 0.029 4998.75 0.214 11.635 0.027 11.244 0.032 11.139 0.040 5027.80 0.953 11.286 0.027 11.005 0.027 10.911 0.038 5031.70 0.053 11.255 0.018 10.944 0.024 10.838 0.028 5033.72 0.104 11.561 0.022 11.042 0.029 10.945 0.046 5058.64 0.738 11.194 0.036 10.785 0.019 10.667 0.015 5083.85 0.380 11.233 0.033 10.786 0.016 10.669 0.027 5085.73 0.428 11.181 0.032 10.769 0.025 .... .... 5086.63 0.451 11.237 0.033 10.780 0.026 10.667 0.030 5087.72 0.478 11.261 0.030 10.790 0.031 10.689 0.037 5088.67 0.503 11.283 0.025 10.817 0.019 10.693 0.034 5090.67 0.553 11.372 0.020 10.886 0.026 10.758 0.036 5092.74 0.606 11.751 0.035 11.284 0.026 11.142 0.024 5379.80 0.911 11.382 0.018 10.894 0.017 10.793 0.023 5408.69 0.647 11.438 0.017 10.947 0.016 10.831 0.027 5410.72 0.698 11.562 0.025 11.080 0.024 10.936 0.027 5413.72 0.775