Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV2260

J œm H œm Ks œm JD � 2445000 Phase

13.360 0.043 12.913 0.044 12.800 0.056 4964.79 0.283 13.500 0.046 13.066 0.043 12.917 0.057 4966.79 0.437 13.120 0.045 12.778 0.039 12.659 0.039 4997.89 0.832 13.462 0.026 13.005 0.035 12.759 0.036 5004.74 0.359 13.135 0.053 12.708 0.054 12.603 0.057 5026.81 0.059 13.211 0.028 12.722 0.031 12.597 0.041 5027.80 0.135 13.417 0.038 13.024 0.042 12.917 0.052 5032.71 0.513 13.468 0.024 13.150 0.026 13.019 0.048 5033.72 0.591 13.265 0.020 12.976 0.031 12.875 0.035 5034.73 0.668 13.239 0.019 12.773 0.018 12.644 0.020 5054.73 0.209 13.186 0.032 12.858 0.030 12.813 0.030 5061.61 0.738 13.472 0.041 13.100 0.022 12.940 0.037 5085.86 0.606 13.095 0.031 12.758 0.034 12.650 0.043 5088.67 0.822 13.116 0.023 12.733 0.026 12.638 0.030 5089.70 0.901 13.102 0.023 12.717 0.024 12.583 0.035 5090.68 0.977 13.102 0.039 12.698 0.039 12.596 0.039 5376.79 0.007 13.152 0.038 12.666 0.039 12.574 0.038 5377.86 0.089 13.207 0.047 12.735 0.037 12.660 0.040 5378.84 0.164 13.122 0.019 12.724 0.018 12.581 0.024 5388.72 0.925 13.433 0.021 13.064 0.019 12.949 0.044 5409.80 0.548 13.228 0.019 12.933 0.020 12.827 0.027 5411.69 0.694 13.087 0.028 12.692 0.030 12.572 0.038 5415.81 0.011 13.401 0.018 12.904 0.020 12.747 0.038 5445.74 0.315