Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV2262

J œm H œm Ks œm JD � 2445000 Phase

12.597 0.040 12.261 0.042 12.312 0.075 4964.80 0.311 12.528 0.041 12.184 0.041 12.129 0.044 4966.80 0.437 12.847 0.033 12.381 0.041 12.268 0.040 4992.81 0.078 12.662 0.022 12.171 0.035 12.036 0.033 5004.78 0.834 12.805 0.053 12.412 0.056 12.305 0.055 5026.84 0.226 12.498 0.027 12.121 0.029 12.007 0.040 5031.71 0.534 12.494 0.029 12.074 0.033 11.971 0.040 5032.72 0.597 12.499 0.018 12.088 0.028 11.959 0.033 5033.73 0.661 12.578 0.019 12.122 0.027 12.001 0.032 5034.73 0.724 12.753 0.019 12.259 0.019 12.128 0.024 5053.73 0.923 12.812 0.018 12.318 0.017 12.190 0.017 5054.74 0.987 12.775 0.018 12.418 0.022 12.284 0.024 5056.81 0.118 12.792 0.027 12.416 0.017 12.285 0.019 5057.83 0.182 12.538 0.018 12.231 0.024 12.150 0.026 5060.60 0.357 12.713 0.027 12.222 0.053 12.089 0.033 5084.86 0.888 12.738 0.025 12.376 0.019 12.300 0.035 5090.69 0.256 12.533 0.018 12.185 0.020 12.070 0.030 5125.58 0.458 12.528 0.035 12.185 0.025 12.072 0.025 5379.81 0.501 12.582 0.019 12.129 0.017 12.009 0.015 5383.76 0.750 12.828 0.016 12.390 0.021 12.272 0.026 5388.77 0.066 12.529 0.021 12.096 0.022 12.010 0.023 5412.67 0.574