Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV2270

J œm H œm Ks œm JD � 2445000 Phase

12.941 0.044 12.497 0.044 12.365 0.052 4964.81 0.392 13.099 0.040 12.593 0.045 12.519 0.049 4966.80 0.538 13.209 0.028 12.844 0.065 12.698 0.034 4998.76 0.884 12.904 0.019 12.561 0.017 12.471 0.019 5001.70 0.099 12.908 0.022 12.482 0.034 12.357 0.035 5004.80 0.327 13.052 0.065 12.749 0.054 12.637 0.056 5026.85 0.946 13.004 0.028 12.629 0.036 12.571 0.052 5027.81 0.016 12.894 0.028 12.447 0.033 12.369 0.042 5030.78 0.234 12.971 0.020 12.512 0.028 12.427 0.028 5060.62 0.424 13.223 0.016 12.794 0.021 12.703 0.024 5065.68 0.795 13.012 0.041 12.674 0.046 12.596 0.049 5081.77 0.977 12.866 0.028 12.466 0.053 12.379 0.029 5084.87 0.204 13.043 0.030 12.560 0.030 12.451 0.041 5088.77 0.490 13.129 0.018 12.660 0.030 12.488 0.028 5089.71 0.559 13.197 0.025 12.699 0.032 12.576 0.038 5090.70 0.632 13.240 0.026 12.766 0.031 12.689 0.028 5377.78 0.702 13.189 0.038 12.721 0.039 12.617 0.038 5377.86 0.708 13.184 0.038 12.803 0.024 12.651 0.028 5378.79 0.777 13.199 0.047 12.773 0.037 12.680 0.040 5378.83 0.779 13.207 0.034 12.837 0.028 12.695 0.043 5379.82 0.852 13.174 0.044 12.814 0.037 12.713 0.037 5379.88 0.856 12.889 0.018 12.538 0.017 12.444 0.027 5383.76 0.141 12.989 0.034 12.525 0.025 12.406 0.022 5386.81 0.365 12.906 0.018 12.587 0.018 12.499 0.026 5409.81 0.053 12.902 0.022 12.468 0.027 12.368 0.024 5412.74 0.268