Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV2282

J œm H œm Ks œm JD � 2445000 Phase

12.898 0.044 12.425 0.044 12.310 0.049 4964.81 0.537 13.007 0.044 12.576 0.042 12.470 0.052 4966.81 0.673 12.801 0.040 12.339 0.043 12.213 0.043 4992.81 0.446 12.994 0.025 12.586 0.040 12.497 0.031 4998.77 0.852 12.610 0.022 12.214 0.037 12.122 0.035 5004.80 0.263 12.676 0.034 12.366 0.033 12.265 0.044 5030.80 0.036 12.651 0.030 12.293 0.032 12.266 0.041 5031.71 0.098 12.629 0.033 12.253 0.034 12.164 0.039 5032.73 0.167 12.971 0.020 12.493 0.027 12.349 0.028 5053.74 0.600 12.989 0.021 12.577 0.021 12.466 0.024 5055.75 0.737 12.971 0.015 12.604 0.027 12.520 0.029 5056.82 0.810 12.740 0.022 12.458 0.031 12.378 0.051 5058.66 0.936 12.691 0.022 12.383 0.020 12.331 0.035 5059.61 0.000 12.668 0.031 12.414 0.027 12.349 0.030 5087.85 0.927 12.713 0.030 12.424 0.032 12.344 0.043 5088.78 0.989 12.669 0.049 12.283 0.057 12.149 0.050 5122.58 0.294 12.707 0.027 12.267 0.028 12.171 0.023 5123.57 0.362 12.909 0.052 12.426 0.052 12.334 0.052 5375.83 0.563 12.952 0.039 12.500 0.039 12.399 0.039 5376.80 0.629 12.955 0.038 12.548 0.039 12.412 0.038 5377.85 0.701 12.961 0.047 12.563 0.037 12.479 0.040 5378.83 0.767 12.962 0.044 12.607 0.037 12.549 0.037 5379.87 0.838 12.647 0.025 12.254 0.025 12.163 0.027 5414.78 0.218