Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV2291

J œm H œm Ks œm JD � 2445000 Phase

12.241 0.036 11.747 0.026 11.627 0.032 4342.70 0.492 12.223 0.015 11.912 0.017 11.823 0.016 4759.60 0.163 12.160 0.042 11.750 0.041 11.662 0.041 4964.82 0.354 12.198 0.042 11.739 0.042 11.626 0.044 4966.82 0.444 12.571 0.044 12.052 0.036 11.906 0.039 4997.81 0.832 12.306 0.032 12.015 0.029 11.907 0.038 5003.78 0.099 12.300 0.023 11.784 0.029 11.684 0.048 5058.66 0.557 12.305 0.020 11.770 0.022 11.666 0.036 5059.61 0.600 12.357 0.021 11.834 0.029 11.752 0.031 5060.65 0.646 12.381 0.023 11.894 0.030 11.727 0.030 5061.62 0.690 12.595 0.032 12.107 0.023 11.966 0.030 5065.73 0.874 12.589 0.021 12.143 0.024 12.035 0.037 5067.62 0.959 12.496 0.035 11.983 0.017 11.836 0.028 5085.79 0.772 12.506 0.033 12.030 0.027 11.896 0.017 5086.87 0.821 12.569 0.031 12.115 0.037 11.972 0.040 5088.68 0.902 12.613 0.034 12.186 0.028 12.015 0.024 5379.83 0.941 12.616 0.020 12.202 0.023 12.078 0.029 5381.79 0.029 12.223 0.018 11.883 0.017 11.789 0.021 5384.76 0.162 12.224 0.025 11.864 0.031 11.746 0.024 5385.80 0.209 12.178 0.018 11.803 0.017 11.689 0.023 5387.79 0.298 12.199 0.021 11.759 0.019 11.656 0.026 5389.71 0.384