Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV2294

J œm H œm Ks œm JD � 2445000 Phase

11.107 0.031 10.793 0.015 10.715 0.042 4290.82 0.486 11.301 0.017 10.867 0.017 10.720 0.023 4343.70 0.934 11.087 0.046 10.722 0.035 10.624 0.034 4406.57 0.655 11.155 0.025 10.733 0.018 10.645 0.018 4668.56 0.829 11.216 0.027 10.773 0.024 10.695 0.019 4670.63 0.885 11.419 0.038 10.979 0.016 10.859 0.018 4675.77 0.026 11.140 0.028 10.714 0.027 10.600 0.038 5031.85 0.776 11.070 0.017 10.720 0.024 10.645 0.025 5060.67 0.565 11.113 0.021 10.703 0.022 10.585 0.021 5066.69 0.730 11.574 0.041 11.146 0.041 11.041 0.040 5081.87 0.146 11.421 0.032 11.118 0.016 11.026 0.023 5085.88 0.255 11.288 0.031 11.026 0.024 10.962 0.017 5086.82 0.281 11.157 0.031 10.948 0.026 10.872 0.030 5087.73 0.306 11.138 0.029 10.930 0.032 10.863 0.038 5088.69 0.332 11.158 0.018 10.932 0.027 10.830 0.026 5089.72 0.361 11.129 0.019 10.843 0.025 10.740 0.035 5092.75 0.443 11.124 0.018 10.868 0.019 10.776 0.022 5383.77 0.412 11.469 0.017 11.029 0.018 10.934 0.023 5408.70 0.094 11.620 0.023 11.183 0.022 11.065 0.023 5412.75 0.205