Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV2324

J œm H œm Ks œm JD � 2445000 Phase

12.986 0.044 12.568 0.044 12.487 0.049 4964.85 0.214 12.852 0.045 12.522 0.046 12.384 0.044 4966.83 0.350 13.024 0.036 12.604 0.043 12.395 0.042 4992.82 0.147 12.671 0.042 12.368 0.037 12.257 0.037 4997.90 0.499 12.687 0.018 12.271 0.017 12.151 0.018 5001.70 0.761 12.922 0.021 12.405 0.034 12.338 0.038 5004.81 0.976 12.688 0.037 12.338 0.041 12.227 0.059 5027.82 0.566 12.797 0.030 12.302 0.028 12.200 0.039 5031.74 0.837 12.830 0.031 12.383 0.034 12.259 0.041 5032.73 0.906 12.981 0.023 12.525 0.033 12.377 0.032 5034.74 0.045 12.721 0.022 12.423 0.020 12.326 0.020 5054.76 0.429 12.649 0.026 12.278 0.019 12.192 0.025 5057.86 0.643 12.701 0.019 12.285 0.028 12.181 0.048 5058.67 0.699 13.001 0.025 12.626 0.024 12.499 0.030 5066.70 0.254 12.724 0.019 12.461 0.040 12.353 0.034 5068.68 0.391 12.651 0.033 12.309 0.017 12.207 0.027 5085.84 0.578 12.739 0.029 12.313 0.031 12.164 0.037 5088.76 0.780 12.913 0.021 12.434 0.021 12.342 0.025 5120.62 0.982 12.769 0.037 12.304 0.025 12.198 0.033 5378.81 0.830 12.777 0.047 12.324 0.037 12.221 0.040 5378.83 0.831 12.682 0.024 12.395 0.019 12.329 0.026 5387.80 0.452 13.016 0.018 12.559 0.025 12.443 0.033 5411.71 0.104 13.002 0.021 12.574 0.025 12.458 0.030 5412.75 0.177