Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV2337

J œm H œm Ks œm JD � 2445000 Phase

13.651 0.073 13.420 0.060 13.315 0.040 4343.71 0.858 13.905 0.029 13.492 0.022 13.360 0.023 4642.81 0.434 13.831 0.025 13.556 0.021 13.479 0.022 5001.71 0.724 13.863 0.056 13.474 0.055 13.346 0.059 5026.83 0.384 13.946 0.031 13.606 0.030 13.453 0.043 5027.82 0.528 13.629 0.030 13.342 0.036 13.251 0.044 5030.79 0.961 13.709 0.032 13.320 0.032 13.253 0.044 5031.81 0.110 13.743 0.031 13.379 0.034 13.307 0.043 5032.82 0.258 13.773 0.025 13.385 0.017 13.355 0.044 5053.75 0.306 13.999 0.030 13.588 0.032 13.493 0.026 5055.76 0.599 13.616 0.031 13.389 0.020 13.282 0.020 5057.77 0.892 13.929 0.039 13.654 0.039 13.520 0.031 5083.80 0.684 13.634 0.029 13.397 0.052 13.315 0.045 5084.83 0.835 13.682 0.037 13.375 0.031 13.272 0.032 5086.77 0.117 13.738 0.036 13.387 0.030 13.284 0.032 5087.81 0.269 13.842 0.034 13.484 0.031 13.343 0.042 5088.78 0.411 13.741 0.060 13.360 0.060 13.302 0.060 5375.83 0.232 14.005 0.062 13.638 0.045 13.521 0.048 5378.87 0.674 13.622 0.052 13.399 0.045 13.380 0.045 5379.86 0.819 13.638 0.023 13.379 0.022 13.275 0.053 5414.80 0.910 13.692 0.027 13.350 0.027 13.252 0.024 5415.77 0.051 13.678 0.033 13.353 0.032 13.225 0.024 5416.78 0.198 13.823 0.044 13.423 0.023 13.369 0.017 5417.78 0.343 13.920 0.015 13.509 0.021 13.424 0.023 5418.78 0.490 13.949 0.027 13.637 0.028 13.524 0.026 5419.78 0.635