Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV2338

J œm H œm Ks œm JD � 2445000 Phase

11.449 0.016 10.952 0.019 10.778 0.019 4343.72 0.051 11.068 0.023 10.643 0.017 10.528 0.021 4668.57 0.758 11.106 0.025 10.662 0.016 10.528 0.015 4669.80 0.787 11.085 0.023 10.663 0.021 10.545 0.015 4670.85 0.812 11.208 0.018 10.767 0.016 10.676 0.016 4676.61 0.949 10.998 0.041 10.638 0.033 10.541 0.036 4997.83 0.570 11.019 0.024 10.637 0.037 10.526 0.028 4998.79 0.592 11.123 0.028 10.847 0.028 10.757 0.038 5031.74 0.374 11.080 0.018 10.782 0.024 10.683 0.029 5033.74 0.422 11.324 0.018 10.862 0.028 10.745 0.045 5058.83 0.017 11.455 0.018 10.972 0.027 10.847 0.025 5061.70 0.085 11.575 0.017 11.142 0.017 10.994 0.021 5065.75 0.181 11.497 0.018 11.095 0.022 10.976 0.033 5067.70 0.227 11.034 0.036 10.668 0.017 10.554 0.016 5083.89 0.611 11.000 0.027 10.619 0.051 10.531 0.031 5084.88 0.635 10.996 0.031 10.619 0.024 10.517 0.017 5086.82 0.681 11.023 0.031 10.619 0.026 10.521 0.030 5087.74 0.703 11.041 0.030 10.622 0.030 10.510 0.037 5088.69 0.725 11.068 0.031 10.713 0.032 10.659 0.043 5121.59 0.506 11.000 0.037 10.621 0.021 10.531 0.027 5378.82 0.608 11.121 0.016 10.673 0.018 10.557 0.024 5388.78 0.845 11.132 0.016 10.687 0.016 10.553 0.017 5389.76 0.868 11.159 0.016 10.907 0.016 10.857 0.020 5408.71 0.317 11.055 0.021 10.743 0.024 10.645 0.026 5414.79 0.462 11.292 0.017 10.826 0.015 10.718 0.018 5437.78 0.007