Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV2339

J œm H œm Ks œm JD � 2445000 Phase

12.650 0.044 12.340 0.046 12.220 0.042 4964.86 0.711 12.616 0.044 12.281 0.045 12.151 0.044 4967.82 0.924 12.664 0.042 12.270 0.033 12.162 0.040 4997.84 0.087 12.739 0.025 12.290 0.040 12.186 0.030 4998.81 0.157 12.838 0.033 12.487 0.045 12.369 0.047 5004.82 0.590 12.863 0.028 12.383 0.033 12.272 0.040 5027.88 0.252 12.914 0.034 12.534 0.031 12.391 0.047 5030.81 0.463 12.860 0.029 12.523 0.028 12.381 0.040 5031.77 0.532 12.577 0.018 12.295 0.035 12.210 0.038 5034.83 0.753 12.929 0.016 12.457 0.017 12.337 0.017 5056.83 0.337 12.914 0.023 12.487 0.018 12.367 0.025 5057.87 0.412 12.827 0.019 12.456 0.026 12.389 0.028 5060.67 0.614 12.647 0.016 12.275 0.016 12.189 0.023 5065.76 0.981 12.770 0.020 12.332 0.025 12.243 0.035 5068.72 0.194 12.887 0.033 12.521 0.021 12.387 0.026 5085.84 0.428 12.864 0.032 12.499 0.028 12.412 0.021 5086.83 0.499 12.597 0.023 12.299 0.022 12.234 0.035 5090.71 0.779 12.669 0.032 12.273 0.034 12.186 0.041 5121.60 0.004 12.919 0.052 12.444 0.052 12.334 0.052 5375.84 0.321 12.801 0.044 12.475 0.037 12.374 0.072 5379.86 0.611 12.697 0.020 12.391 0.022 12.266 0.025 5380.83 0.681 12.645 0.019 12.301 0.032 12.208 0.043 5410.73 0.835 12.668 0.028 12.259 0.027 12.145 0.028 5413.73 0.052 12.721 0.022 12.287 0.029 12.162 0.030 5414.79 0.128