Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV2352

J œm H œm Ks œm JD � 2445000 Phase

12.872 0.017 12.539 0.019 12.462 0.018 4759.60 0.300 12.913 0.044 12.586 0.044 12.462 0.044 4962.82 0.214 12.748 0.044 12.437 0.044 12.367 0.044 4966.84 0.509 12.712 0.034 12.452 0.043 12.350 0.040 4992.83 0.416 12.919 0.022 12.508 0.019 12.409 0.023 5001.79 0.074 12.962 0.018 12.565 0.020 12.459 0.024 5002.87 0.153 12.846 0.054 12.437 0.055 12.297 0.055 5026.83 0.912 12.882 0.026 12.462 0.030 12.329 0.039 5027.83 0.985 12.879 0.032 12.556 0.035 12.460 0.042 5032.83 0.352 12.775 0.024 12.371 0.025 12.259 0.026 5066.71 0.838 12.740 0.035 12.508 0.041 12.375 0.037 5087.85 0.390 12.706 0.031 12.432 0.034 12.350 0.040 5088.79 0.458 12.675 0.025 12.368 0.024 12.305 0.038 5090.73 0.601 12.733 0.032 12.365 0.029 12.281 0.038 5092.76 0.750 12.893 0.027 12.478 0.025 12.365 0.021 5123.58 0.012 12.680 0.038 12.349 0.039 12.262 0.038 5377.85 0.672 12.708 0.044 12.337 0.037 12.284 0.037 5379.86 0.820 12.699 0.021 12.390 0.019 12.295 0.024 5389.77 0.547 12.902 0.026 12.580 0.031 12.462 0.031 5413.74 0.307