Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV2369

J œm H œm Ks œm JD � 2445000 Phase

11.282 0.017 10.801 0.016 10.610 0.015 4343.73 0.891 10.847 0.046 10.504 0.035 10.412 0.034 4406.58 0.192 10.883 0.023 10.418 0.016 10.312 0.019 4668.58 0.614 10.920 0.025 10.452 0.028 10.348 0.015 4670.64 0.657 11.077 0.017 10.604 0.016 10.466 0.015 4676.63 0.781 10.850 0.020 10.389 0.032 10.265 0.033 5004.83 0.572 10.869 0.029 10.589 0.033 10.475 0.036 5032.77 0.151 10.958 0.015 10.473 0.016 10.354 0.034 5059.66 0.707 11.162 0.016 10.673 0.017 10.524 0.021 5065.77 0.834 10.781 0.028 10.468 0.051 10.369 0.034 5084.88 0.229 10.820 0.032 10.477 0.016 10.374 0.023 5085.80 0.248 10.781 0.031 10.445 0.025 10.344 0.016 5086.83 0.269 10.786 0.032 10.432 0.026 10.315 0.031 5087.74 0.288 10.781 0.029 10.420 0.031 10.313 0.038 5088.70 0.308 10.760 0.024 10.386 0.018 10.277 0.035 5090.73 0.350 11.252 0.030 10.823 0.032 10.685 0.040 5121.67 0.990 11.112 0.023 10.752 0.020 10.659 0.020 5123.63 0.031 10.960 0.021 10.664 0.015 10.562 0.021 5126.62 0.093 10.784 0.016 10.400 0.016 10.275 0.020 5381.80 0.374 10.785 0.016 10.390 0.017 10.247 0.017 5383.78 0.415 10.848 0.031 10.396 0.022 10.263 0.016 5386.82 0.478 10.815 0.019 10.380 0.015 10.253 0.022 5387.81 0.498 10.823 0.017 10.370 0.015 10.244 0.017 5389.78 0.539 11.241 0.016 10.768 0.017 10.631 0.016 5408.73 0.931 11.254 0.016 10.791 0.019 10.658 0.023 5409.82 0.954 11.213 0.024 10.814 0.023 10.692 0.023 5412.76 0.014