Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV2405

J œm H œm Ks œm JD � 2445000 Phase

14.027 0.035 13.636 0.039 13.487 0.096 4343.74 0.370 13.772 0.033 13.423 0.016 13.366 0.022 4644.88 0.862 13.812 0.018 13.512 0.025 13.437 0.024 5002.86 0.567 13.829 0.031 13.465 0.040 13.430 0.045 5030.79 0.600 13.733 0.035 13.408 0.030 13.359 0.043 5031.82 0.749 13.784 0.025 13.439 0.026 13.315 0.030 5053.85 0.931 13.854 0.017 13.472 0.023 13.363 0.031 5054.77 0.063 13.922 0.020 13.544 0.028 13.384 0.027 5055.76 0.207 13.770 0.050 13.438 0.047 13.359 0.052 5081.75 0.960 13.982 0.040 13.563 0.020 13.451 0.036 5083.80 0.256 13.764 0.034 13.433 0.034 13.405 0.023 5086.77 0.685 13.785 0.031 13.423 0.034 13.339 0.037 5087.81 0.836 13.958 0.060 13.591 0.060 13.515 0.060 5375.84 0.436 13.788 0.047 13.483 0.047 13.420 0.047 5376.80 0.575 13.764 0.054 13.418 0.045 13.369 0.048 5378.82 0.866 13.780 0.052 13.439 0.045 13.402 0.063 5379.85 0.015 13.872 0.029 13.528 0.030 13.434 0.034 5415.78 0.205 13.980 0.044 13.604 0.036 13.524 0.032 5416.79 0.351 13.896 0.035 13.592 0.028 13.559 0.032 5417.79 0.494 13.757 0.018 13.437 0.017 13.410 0.025 5418.80 0.640 13.744 0.025 13.419 0.018 13.368 0.025 5419.79 0.783