Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV2432

J œm H œm Ks œm JD � 2445000 Phase

13.134 0.018 12.686 0.023 12.588 0.024 4343.76 0.615 12.911 0.022 12.556 0.025 12.483 0.019 4645.84 0.266 13.061 0.044 12.614 0.046 12.562 0.046 4964.86 0.469 13.165 0.044 12.818 0.046 12.722 0.047 4966.84 0.650 12.973 0.020 12.712 0.020 12.596 0.019 5001.79 0.849 12.952 0.016 12.638 0.022 12.558 0.027 5002.85 0.946 13.080 0.028 12.642 0.033 12.574 0.041 5030.81 0.506 13.058 0.016 12.756 0.019 12.706 0.018 5055.82 0.795 12.915 0.020 12.613 0.031 12.578 0.035 5068.75 0.978 12.826 0.044 12.539 0.041 12.466 0.043 5081.76 0.169 12.970 0.037 12.611 0.018 12.531 0.024 5083.82 0.358 13.076 0.034 12.683 0.017 12.614 0.036 5085.83 0.542 13.111 0.033 12.807 0.027 12.694 0.036 5087.86 0.727 12.889 0.022 12.596 0.025 12.505 0.032 5091.56 0.066 12.946 0.023 12.653 0.024 12.578 0.028 5123.64 0.002 12.872 0.017 12.575 0.021 12.511 0.032 5124.56 0.087 12.887 0.038 12.524 0.039 12.463 0.038 5377.84 0.272 13.135 0.028 12.739 0.022 12.675 0.023 5413.83 0.566 13.188 0.035 12.819 0.036 12.676 0.027 5414.81 0.656 13.103 0.029 12.783 0.029 12.706 0.023 5415.74 0.741 13.107 0.027 12.789 0.024 12.703 0.022 5415.79 0.746 12.968 0.033 12.710 0.032 12.631 0.029 5416.80 0.838 12.991 0.036 12.686 0.034 12.595 0.024 5416.81 0.838 12.925 0.035 12.657 0.023 12.581 0.034 5417.80 0.930 12.893 0.017 12.598 0.015 12.541 0.029 5418.80 0.021 12.830 0.018 12.548 0.023 12.464 0.029 5419.80 0.112 12.909 0.030 12.611 0.032 12.555 0.032 5440.74 0.029 12.979 0.024 12.673 0.041 12.509 0.022 5444.72 0.394 13.099 0.021 12.712 0.027 12.603 0.036 5445.72 0.485 13.168 0.019 12.760 0.021 12.625 0.017 5446.57 0.563