Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV2447

J œm H œm Ks œm JD � 2445000 Phase

10.001 0.017 9.578 0.016 9.400 0.016 4343.79 0.441 10.268 0.066 9.890 0.053 9.733 0.052 4410.53 0.001 10.093 0.050 9.730 0.032 9.606 0.039 4666.59 0.149 10.079 0.023 9.708 0.017 9.588 0.017 4668.85 0.168 10.105 0.025 9.696 0.021 9.571 0.018 4670.65 0.183 10.061 0.023 9.687 0.021 9.581 0.017 4670.70 0.184 10.036 0.017 9.661 0.017 9.555 0.017 4676.63 0.233 10.181 0.027 9.760 0.052 .... .... 5084.89 0.658 10.250 0.031 9.798 0.027 9.644 0.030 5087.75 0.682 10.175 0.031 9.808 0.030 9.666 0.039 5121.68 0.967 10.195 0.029 9.789 0.016 9.663 0.021 5126.63 0.009 9.996 0.049 9.682 0.049 9.560 0.049 5375.90 0.100 10.023 0.033 9.649 0.021 9.517 0.022 5379.84 0.133 9.978 0.017 9.619 0.016 9.495 0.018 5384.76 0.174 9.986 0.015 9.592 0.018 9.473 0.023 5388.78 0.208 9.995 0.016 9.560 0.016 9.431 0.017 5408.74 0.375 10.019 0.028 9.567 0.024 9.430 0.022 5415.62 0.433 10.180 0.016 9.738 0.016 9.579 0.021 5436.82 0.611