Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV2463

J œm H œm Ks œm JD � 2445000 Phase

12.702 0.046 12.329 0.042 12.191 0.045 4963.82 0.443 12.940 0.043 12.516 0.049 12.370 0.044 4966.85 0.660 12.821 0.097 12.520 0.045 12.340 0.058 4967.83 0.730 12.864 0.025 12.451 0.038 12.449 0.031 4998.81 0.949 12.690 0.022 12.292 0.037 12.194 0.037 5004.83 0.380 12.708 0.037 12.341 0.032 12.243 0.043 5030.82 0.241 12.652 0.027 12.262 0.029 12.191 0.040 5031.77 0.309 12.677 0.030 12.305 0.036 12.225 0.038 5032.78 0.381 12.832 0.019 12.523 0.025 12.455 0.021 5053.84 0.889 12.567 0.016 12.310 0.017 12.237 0.024 5055.83 0.032 12.545 0.017 12.288 0.017 12.207 0.021 5056.86 0.106 12.956 0.022 12.588 0.027 12.472 0.021 5066.72 0.811 12.534 0.028 12.268 0.052 12.225 0.033 5084.88 0.112 12.647 0.033 12.305 0.018 12.238 0.031 5085.80 0.178 12.669 0.030 12.269 0.030 12.183 0.039 5088.79 0.392 12.906 0.022 12.500 0.021 12.412 0.028 5120.63 0.672 12.605 0.039 12.307 0.039 12.266 0.039 5376.81 0.016 12.496 0.038 12.230 0.039 12.197 0.038 5377.84 0.090 12.652 0.047 12.314 0.037 12.253 0.040 5378.82 0.160 12.787 0.021 12.339 0.017 12.226 0.023 5383.79 0.516 12.831 0.020 12.420 0.024 12.286 0.031 5384.77 0.586 12.927 0.021 12.480 0.032 12.380 0.023 5385.81 0.660 12.874 0.020 12.525 0.020 12.431 0.023 5388.79 0.874 12.720 0.021 12.304 0.015 12.204 0.035 5410.74 0.446 12.894 0.026 12.530 0.031 12.450 0.021 5415.82 0.809