Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV2527

J œm H œm Ks œm JD � 2445000 Phase

12.976 0.023 12.602 0.030 12.465 0.018 4343.81 0.482 12.904 0.041 12.685 0.043 12.548 0.055 4962.84 0.291 12.954 0.042 12.636 0.041 12.548 0.046 4963.83 0.368 12.923 0.041 12.543 0.040 12.450 0.044 4966.86 0.602 13.275 0.029 12.853 0.043 12.785 0.032 4998.84 0.072 13.005 0.032 12.559 0.037 12.406 0.037 5032.79 0.694 13.028 0.022 12.572 0.029 12.451 0.034 5033.74 0.767 13.131 0.021 12.671 0.029 12.563 0.044 5034.75 0.845 12.927 0.017 12.554 0.017 12.439 0.027 5056.86 0.553 13.229 0.023 12.733 0.035 12.605 0.028 5061.64 0.922 13.175 0.017 12.835 0.021 12.737 0.025 5065.78 0.242 12.939 0.042 12.567 0.042 12.507 0.050 5081.76 0.476 13.057 0.033 12.625 0.021 12.506 0.028 5085.85 0.792 13.303 0.032 12.837 0.036 12.713 0.039 5088.71 0.012 13.252 0.027 12.882 0.029 12.750 0.035 5090.78 0.172 12.947 0.038 12.645 0.039 12.573 0.038 5377.83 0.342 12.955 0.047 12.613 0.037 12.523 0.040 5378.81 0.418 13.169 0.021 12.706 0.020 12.565 0.029 5384.78 0.879 13.267 0.025 12.863 0.021 12.731 0.027 5387.81 0.113 13.004 0.021 12.544 0.023 12.441 0.024 5408.75 0.730 13.258 0.016 12.780 0.016 12.632 0.029 5411.73 0.960 12.973 0.019 12.542 0.027 12.437 0.022 5446.56 0.650