Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV2538

J œm H œm Ks œm JD � 2445000 Phase

12.767 0.041 12.365 0.040 12.238 0.043 4963.84 0.910 12.822 0.041 12.365 0.041 12.285 0.049 4964.87 0.985 12.929 0.040 12.458 0.050 12.351 0.044 4967.84 0.199 12.996 0.025 12.549 0.039 12.494 0.030 4998.84 0.434 12.985 0.037 12.593 0.047 .... .... 5027.83 0.525 12.836 0.033 12.447 0.041 12.378 0.042 5030.83 0.741 12.775 0.030 12.386 0.029 12.251 0.041 5031.78 0.809 12.844 0.021 12.407 0.026 12.273 0.033 5034.76 0.024 12.975 0.016 12.552 0.022 12.422 0.025 5065.80 0.262 12.996 0.022 12.543 0.021 12.404 0.025 5066.73 0.329 12.964 0.020 12.560 0.028 12.473 0.037 5067.75 0.403 12.976 0.030 12.596 0.041 .... .... 5068.76 0.476 12.828 0.037 12.504 0.052 12.378 0.031 5084.85 0.635 12.786 0.034 12.433 0.023 12.319 0.025 5085.81 0.705 12.696 0.036 12.323 0.027 12.223 0.033 5087.88 0.854 12.952 0.017 12.610 0.029 12.488 0.031 5125.60 0.574 12.842 0.039 12.468 0.039 12.388 0.039 5376.81 0.687 12.751 0.038 12.389 0.039 12.289 0.038 5377.83 0.761 12.825 0.021 12.380 0.022 12.281 0.025 5381.81 0.048 12.851 0.017 12.405 0.021 12.319 0.024 5410.76 0.135 12.971 0.025 12.526 0.023 12.421 0.024 5413.75 0.351 12.827 0.019 12.389 0.018 12.272 0.026 5437.77 0.082 12.972 0.031 12.537 0.033 12.409 0.037 5440.73 0.296