Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV2549

J œm H œm Ks œm JD � 2445000 Phase

12.423 0.018 12.042 0.019 11.879 0.015 4343.81 0.191 12.305 0.026 12.008 0.028 11.926 0.027 4760.62 0.925 12.554 0.040 12.135 0.051 12.039 0.051 4962.84 0.411 12.592 0.043 12.178 0.041 12.072 0.043 4963.84 0.473 12.456 0.042 12.179 0.044 12.060 0.041 4967.84 0.720 12.599 0.044 12.258 0.039 12.156 0.036 4997.85 0.573 12.595 0.024 12.242 0.038 12.175 0.032 4998.85 0.634 12.294 0.021 11.944 0.026 11.857 0.042 5005.80 0.063 12.223 0.019 11.993 0.025 11.967 0.034 5033.75 0.789 12.249 0.016 12.006 0.027 11.926 0.031 5034.76 0.851 12.330 0.015 11.964 0.016 11.858 0.017 5055.84 0.153 12.485 0.019 12.063 0.027 11.973 0.045 5058.68 0.328 12.622 0.019 12.229 0.029 12.123 0.027 5061.80 0.520 12.277 0.018 12.018 0.023 11.932 0.034 5067.76 0.888 12.280 0.032 11.970 0.015 11.887 0.024 5085.81 0.003 12.284 0.031 11.930 0.027 11.860 0.033 5087.86 0.130 12.295 0.025 12.002 0.026 11.922 0.025 5376.83 0.971 12.298 0.024 11.970 0.026 11.882 0.024 5377.79 0.030 12.268 0.038 11.945 0.039 11.863 0.038 5377.83 0.032 12.417 0.015 12.125 0.016 12.051 0.023 5389.79 0.771 12.331 0.020 12.023 0.018 11.947 0.022 5408.80 0.945 12.539 0.033 12.129 0.031 12.001 0.022 5416.83 0.441