Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV2579

J œm H œm Ks œm JD � 2445000 Phase

12.878 0.042 12.457 0.046 12.352 0.043 4963.85 0.573 12.706 0.040 12.414 0.041 12.318 0.044 4966.87 0.797 12.642 0.043 12.371 0.047 12.239 0.041 4967.85 0.870 12.771 0.033 12.438 0.040 12.349 0.045 4992.87 0.733 12.625 0.024 12.248 0.039 12.156 0.032 4998.87 0.180 12.696 0.027 12.281 0.033 12.209 0.046 5027.84 0.336 12.868 0.028 12.489 0.032 12.359 0.039 5031.86 0.636 12.641 0.019 12.254 0.021 12.186 0.028 5053.84 0.272 12.851 0.036 12.426 0.019 12.336 0.026 5083.82 0.505 12.839 0.032 12.491 0.016 12.388 0.023 5085.86 0.657 12.506 0.019 12.237 0.027 12.146 0.029 5089.73 0.945 12.530 0.025 12.254 0.022 12.154 0.036 5090.79 0.023 12.615 0.019 12.262 0.020 12.168 0.027 5091.60 0.084 12.754 0.044 12.327 0.051 12.231 0.047 5122.59 0.391 12.828 0.024 12.414 0.026 12.272 0.019 5123.65 0.470 12.655 0.052 12.240 0.052 12.168 0.052 5375.84 0.247 12.814 0.044 12.420 0.037 12.351 0.037 5379.85 0.545 12.493 0.018 12.250 0.015 12.159 0.019 5384.79 0.913 12.650 0.030 12.277 0.022 12.173 0.016 5386.82 0.064 12.511 0.023 12.230 0.025 12.155 0.028 5412.76 0.995 12.644 0.033 12.270 0.031 12.158 0.022 5416.84 0.299 12.686 0.019 12.369 0.016 12.271 0.027 5436.80 0.785 12.731 0.029 12.315 0.031 12.203 0.026 5444.74 0.376