Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV2580

J œm H œm Ks œm JD � 2445000 Phase

12.482 0.031 11.990 0.021 11.871 0.015 4343.82 0.688 12.342 0.016 12.081 0.015 12.000 0.019 4759.68 0.262 12.329 0.040 11.918 0.040 11.854 0.041 4966.87 0.505 12.666 0.033 12.317 0.039 12.164 0.042 4992.88 0.042 12.342 0.024 11.984 0.041 11.900 0.029 4998.88 0.397 12.601 0.024 12.104 0.028 11.949 0.040 5005.81 0.806 12.732 0.028 12.385 0.045 12.248 0.041 5027.85 0.109 12.353 0.028 12.010 0.035 11.956 0.039 5031.79 0.341 12.411 0.019 11.973 0.016 11.890 0.018 5053.83 0.644 12.713 0.019 12.249 0.028 12.151 0.045 5058.69 0.931 12.697 0.016 12.278 0.019 12.183 0.037 5059.68 0.989 12.342 0.018 11.954 0.022 11.856 0.033 5067.77 0.467 12.348 0.041 12.048 0.042 11.975 0.042 5081.78 0.295 12.337 0.032 11.949 0.017 11.848 0.024 5085.82 0.534 12.374 0.033 11.971 0.024 11.856 0.018 5086.80 0.592 12.452 0.051 12.069 0.051 11.956 0.051 5122.69 0.713 12.615 0.018 12.155 0.019 12.021 0.026 5124.58 0.824 12.694 0.020 12.223 0.021 12.095 0.027 5125.61 0.885 12.450 0.052 11.977 0.052 11.874 0.052 5375.85 0.673 12.560 0.024 12.093 0.025 11.985 0.026 5377.80 0.788 12.529 0.038 12.076 0.039 11.974 0.038 5377.82 0.789 12.642 0.047 12.184 0.037 12.061 0.040 5378.81 0.848 12.633 0.037 12.148 0.021 12.038 0.029 5378.83 0.849 12.655 0.017 12.301 0.017 12.214 0.017 5383.80 0.142 12.417 0.017 12.170 0.019 12.084 0.020 5384.80 0.202 12.374 0.019 12.101 0.031 12.013 0.024 5385.82 0.262 12.344 0.017 11.964 0.019 11.868 0.023 5388.80 0.438