Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV2733

J œm H œm Ks œm JD � 2445000 Phase

13.467 0.035 13.147 0.015 13.019 0.029 4343.83 0.056 13.553 0.025 13.141 0.031 13.019 0.030 4760.69 0.851 13.360 0.039 13.065 0.036 12.953 0.036 4999.90 0.279 13.331 0.021 13.002 0.021 12.921 0.026 5001.83 0.500 13.497 0.032 13.094 0.030 13.038 0.043 5030.82 0.824 13.539 0.028 13.156 0.031 13.078 0.043 5031.85 0.942 13.347 0.021 13.006 0.020 12.938 0.032 5053.82 0.461 13.341 0.019 13.059 0.025 12.902 0.019 5054.84 0.579 13.418 0.023 13.029 0.017 12.951 0.031 5055.84 0.693 13.539 0.037 13.150 0.020 13.042 0.025 5083.81 0.900 13.476 0.033 13.128 0.056 13.076 0.036 5084.84 0.018 13.382 0.035 13.108 0.028 13.091 0.032 5085.83 0.132 13.307 0.034 12.994 0.028 12.929 0.035 5087.82 0.360 13.348 0.060 12.981 0.052 12.947 0.052 5375.86 0.386 13.363 0.047 13.013 0.047 12.942 0.047 5376.82 0.496 13.359 0.046 13.000 0.047 12.935 0.046 5377.82 0.610 13.476 0.054 13.067 0.045 12.998 0.048 5378.80 0.723 13.549 0.033 13.158 0.030 13.010 0.025 5414.82 0.853 13.509 0.031 13.152 0.033 13.073 0.023 5415.87 0.974 13.378 0.043 13.034 0.024 12.999 0.017 5417.81 0.196 13.341 0.029 13.002 0.017 12.959 0.019 5418.83 0.313 13.358 0.017 13.015 0.019 12.953 0.023 5419.83 0.427 13.451 0.029 13.033 0.018 13.026 0.034 5439.65 0.700 13.537 0.026 13.140 0.033 13.032 0.036 5440.69 0.820 13.355 0.015 12.994 0.018 12.965 0.026 5445.71 0.395 13.392 0.017 13.050 0.027 12.947 0.029 5446.62 0.499