Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV2749

J œm H œm Ks œm JD � 2445000 Phase

12.574 0.023 11.996 0.023 11.781 0.016 4343.84 0.003 12.571 0.028 11.992 0.020 11.785 0.020 4668.59 0.058 12.615 0.028 12.087 0.019 11.857 0.016 4669.84 0.112 12.598 0.037 12.055 0.024 11.886 0.021 4670.71 0.150 12.443 0.025 11.984 0.015 11.872 0.016 4676.64 0.407 12.516 0.047 11.937 0.025 11.762 0.027 4758.68 0.957 12.564 0.016 12.032 0.018 11.855 0.019 4761.71 0.088 12.409 0.041 11.839 0.041 11.670 0.044 4962.85 0.794 12.463 0.040 11.878 0.042 11.688 0.047 4964.88 0.881 12.611 0.043 12.105 0.035 11.963 0.038 4997.86 0.309 12.553 0.024 12.065 0.043 11.911 0.030 4998.88 0.353 12.370 0.033 11.865 0.030 11.713 0.037 5003.79 0.566 12.371 0.022 11.840 0.028 11.679 0.039 5005.82 0.653 12.399 0.028 11.842 0.030 11.678 0.041 5030.84 0.736 12.518 0.023 11.933 0.029 11.746 0.045 5058.71 0.943 12.654 0.019 12.151 0.018 12.008 0.028 5065.82 0.250 12.606 0.031 12.102 0.026 11.920 0.032 5087.77 0.200 12.351 0.052 11.857 0.052 11.717 0.052 5375.86 0.669 12.421 0.033 11.847 0.022 11.688 0.026 5379.85 0.841 12.471 0.020 11.902 0.020 11.724 0.021 5381.82 0.927 12.612 0.015 12.032 0.016 11.859 0.023 5408.81 0.095 12.457 0.028 12.002 0.019 11.832 0.022 5439.64 0.429 12.417 0.025 11.958 0.030 11.808 0.033 5440.68 0.474