Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV2793

J œm H œm Ks œm JD � 2445000 Phase

12.424 0.025 11.924 0.024 11.767 0.040 4292.85 0.769 12.276 0.029 11.833 0.018 11.703 0.026 4343.85 0.427 12.268 0.024 11.893 0.021 11.743 0.021 4668.60 0.355 12.233 0.028 11.824 0.028 11.731 0.022 4670.72 0.466 12.378 0.018 11.901 0.020 11.758 0.020 4676.65 0.775 12.337 0.041 11.851 0.042 11.741 0.051 4962.86 0.694 12.280 0.027 11.828 0.040 11.709 0.030 4998.90 0.573 12.527 0.024 11.986 0.035 11.843 0.035 5004.86 0.883 12.385 0.033 12.035 0.034 11.961 0.049 5030.85 0.238 12.358 0.020 11.864 0.021 11.741 0.035 5059.69 0.741 12.601 0.025 12.175 0.023 12.034 0.024 5066.74 0.109 12.621 0.021 12.181 0.027 12.075 0.035 5067.71 0.159 12.573 0.031 12.097 0.053 11.976 0.032 5084.68 0.044 12.529 0.034 12.156 0.028 12.046 0.033 5087.87 0.210 12.363 0.033 12.069 0.036 11.960 0.042 5088.77 0.257 12.319 0.023 11.983 0.030 11.883 0.029 5089.74 0.308 12.592 0.035 12.063 0.034 11.904 0.057 5121.66 0.972 12.601 0.045 12.115 0.052 12.002 0.047 5122.60 0.021 12.255 0.018 11.830 0.019 11.721 0.024 5381.83 0.533 12.268 0.022 11.817 0.019 11.697 0.020 5383.80 0.636 12.432 0.028 11.932 0.021 11.795 0.023 5387.83 0.846 12.554 0.021 12.020 0.024 11.875 0.022 5389.79 0.948