Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV2827

J œm H œm Ks œm JD � 2445000 Phase

10.391 0.020 9.898 0.024 9.784 0.027 4289.80 0.398 10.372 0.016 9.964 0.016 9.838 0.023 4344.54 0.092 10.482 0.066 10.078 0.052 9.966 0.054 4410.55 0.929 10.276 0.041 9.890 0.022 9.772 0.028 4666.58 0.176 10.322 0.023 9.877 0.017 9.755 0.017 4668.86 0.204 10.303 0.023 9.858 0.021 9.757 0.021 4670.73 0.228 10.309 0.017 9.863 0.015 9.728 0.016 4676.71 0.304 10.420 0.040 10.024 0.040 9.882 0.040 4967.86 0.996 10.393 0.020 9.898 0.032 9.753 0.033 5004.87 0.465 10.390 0.021 9.897 0.026 9.772 0.038 5005.83 0.477 10.597 0.025 10.120 0.030 9.988 0.039 5027.85 0.757 10.538 0.016 10.137 0.027 10.001 0.032 5034.66 0.843 10.352 0.019 9.902 0.029 9.807 0.045 5058.72 0.148 10.377 0.036 9.912 0.019 9.790 0.027 5085.88 0.493 10.412 0.031 9.924 0.027 9.802 0.031 5087.78 0.517 10.433 0.023 9.948 0.018 9.818 0.034 5090.80 0.555 10.319 0.033 9.886 0.022 9.770 0.021 5379.86 0.220 10.323 0.016 9.870 0.016 9.748 0.016 5383.81 0.271 10.346 0.015 9.877 0.018 9.755 0.023 5388.81 0.334 10.502 0.019 10.004 0.015 9.859 0.024 5410.76 0.612 10.545 0.026 10.047 0.025 9.931 0.022 5415.64 0.674 10.378 0.015 9.969 0.019 9.857 0.015 5445.78 0.056