Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV2836

J œm H œm Ks œm JD � 2445000 Phase

12.873 0.016 12.328 0.017 12.153 0.028 4344.55 0.866 12.577 0.047 12.132 0.026 11.990 0.031 4758.71 0.495 12.650 0.017 12.133 0.016 11.989 0.023 4761.73 0.667 12.995 0.041 12.550 0.044 12.380 0.044 4962.87 0.142 12.808 0.040 12.408 0.041 12.292 0.064 4963.86 0.199 12.613 0.044 12.209 0.040 12.092 0.048 4966.88 0.371 12.621 0.026 12.114 0.027 11.981 0.041 5005.83 0.593 12.930 0.028 12.469 0.028 12.307 0.040 5031.80 0.075 12.621 0.019 12.152 0.016 12.028 0.021 5055.86 0.448 12.655 0.016 12.149 0.016 12.010 0.033 5059.80 0.672 12.712 0.018 12.190 0.024 12.046 0.027 5060.81 0.730 12.779 0.018 12.228 0.027 12.066 0.029 5061.81 0.787 12.945 0.027 12.462 0.031 12.290 0.030 5065.83 0.016 12.956 0.020 12.485 0.021 12.325 0.021 5066.76 0.070 12.946 0.041 12.422 0.042 12.282 0.041 5081.86 0.931 12.937 0.037 12.433 0.019 12.262 0.017 5083.69 0.035 12.920 0.038 12.443 0.018 12.282 0.017 5083.72 0.037 12.956 0.029 12.480 0.051 12.307 0.038 5084.86 0.102 12.952 0.034 12.549 0.032 12.335 0.034 5085.72 0.151 12.713 0.033 12.366 0.026 12.264 0.019 5086.81 0.214 12.657 0.033 12.309 0.028 12.132 0.031 5087.79 0.269 12.648 0.030 12.249 0.035 12.143 0.039 5088.77 0.325 12.717 0.052 12.168 0.052 11.988 0.052 5375.88 0.706 12.786 0.038 12.239 0.039 12.077 0.038 5377.81 0.816 12.827 0.023 12.252 0.027 12.123 0.028 5377.81 0.816 12.929 0.023 12.457 0.018 12.252 0.028 5380.84 0.988 12.614 0.018 12.181 0.015 12.067 0.022 5387.83 0.387 12.636 0.016 12.119 0.024 11.953 0.024 5409.83 0.642 12.942 0.026 12.436 0.030 12.257 0.023 5415.83 0.985