Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV2854

J œm H œm Ks œm JD � 2445000 Phase

13.492 0.018 13.064 0.034 12.962 0.022 4344.56 0.140 13.409 0.040 12.981 0.026 12.915 0.025 4645.85 0.033 13.264 0.042 12.902 0.035 12.823 0.040 4997.86 0.798 13.392 0.020 13.080 0.020 13.010 0.019 5001.83 0.258 13.249 0.028 12.949 0.035 12.818 0.042 5030.83 0.616 13.250 0.028 12.894 0.031 12.821 0.039 5031.86 0.735 13.294 0.030 12.941 0.037 12.825 0.042 5032.85 0.851 13.421 0.019 13.080 0.022 13.022 0.032 5053.81 0.278 13.254 0.017 12.917 0.017 12.862 0.019 5055.85 0.514 13.356 0.034 12.975 0.019 .... .... 5085.71 0.972 13.463 0.033 13.064 0.026 12.954 0.023 5086.76 0.093 13.468 0.032 13.135 0.027 13.046 0.035 5087.79 0.213 13.382 0.034 13.084 0.031 13.043 0.037 5088.81 0.331 13.237 0.060 12.907 0.052 12.858 0.052 5375.85 0.573 13.245 0.039 12.899 0.039 12.819 0.039 5376.82 0.686 13.273 0.038 12.894 0.039 12.842 0.038 5377.81 0.800 13.324 0.047 12.944 0.037 12.860 0.040 5378.80 0.914 13.357 0.052 12.991 0.045 12.922 0.072 5379.84 0.035 13.372 0.023 12.947 0.022 12.884 0.027 5413.84 0.973 13.432 0.027 13.067 0.025 12.964 0.024 5414.82 0.087 13.483 0.033 13.121 0.025 12.997 0.028 5415.81 0.201 13.383 0.036 13.083 0.031 12.962 0.035 5416.81 0.317 13.230 0.036 12.945 0.025 12.909 0.025 5417.82 0.433 13.266 0.015 12.944 0.024 12.868 0.023 5418.84 0.552 13.241 0.017 12.927 0.019 12.819 0.028 5419.84 0.667 13.239 0.019 12.933 0.026 12.803 0.026 5436.76 0.627 13.239 0.015 12.904 0.024 12.794 0.022 5437.71 0.737 13.287 0.016 12.902 0.021 12.841 0.023 5438.74 0.856 13.383 0.028 12.973 0.020 12.838 0.022 5439.63 0.959 13.447 0.025 13.045 0.034 12.931 0.033 5440.71 0.084 13.240 0.017 12.880 0.019 12.825 0.022 5445.64 0.656 13.285 0.017 12.924 0.022 12.841 0.021 5446.66 0.773